13−10

12−10

11−10

10−10

9−10

8−10

7−10

6−10

5−10

4−10

3−10

2−10

1−10 1 10 210 310 410

ATLAS Pythia 8.308 default

2760 GeV PbPb Heavy Ion minbias

mcplots.cern.ch [arXiv:1306.3436] Rivet 3.1.10, 1M events

(ATLAS_2015_I1360290)

(ATLAS charged particle spectra)

spectra Tp

0 20 40 60 80

1

Ratio to ATLAS

2

0.5

2

0.5

1