η

0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

+/K^-K

LHCB Pythia 8.308 default Pythia 8.308 tune-A14-CTEQL1 Pythia 8.308 tune-A14-MSTW2008LO Pythia 8.308 tune-A14-NNPDF2.3LO