0

0.01

0.02

0.03

0.04

0.05

0.06 CMS

13000 GeV pp Top

mcplots.cern.ch [arXiv:1306.3436]

(CMS_2022_I2129461)

(cms2022-tw)

l_Tp

50 100 150

1

Ratio to CMS

2

0.5

2

0.5

1