0 0.001

0.002

0.003

0.004

0.005

0.006

0.007

0.008

0.009

CMS Pythia 8.315 default Pythia 8.315 default-noFsr Pythia 8.315 default-noRap

13000 GeV pp Top

mcplots.cern.ch [arXiv:1306.3436] 2.1M events ≥ Rivet 4.1.0,

(CMS_2022_I2129461)

(cms2022-tw)

llj.pz

0 100 200 300 400

1

Ratio to CMS

2

0.5

2

0.5

1