)^*η cos(#th

0 10 20 30 40 50 60 70 80 90

] [{pb} )^*η dcos(#th σd #

CMS

13000 GeV pp tt

mcplots.cern.ch [arXiv:1306.3436]

(CMS_2021_I1901295)

+{jets} μ e/}t{

CMS, 13 TeV, {t}

1− 0.5− 0 0.5 1

)^*η cos(#th

1

Ratio to CMS

2

0.5

2

0.5

1