2−10

1−10

1

ATLAS Herwig++ 2.7.1 default Herwig 7.2.1 default Pythia 8.315 default

13000 GeV pp W

mcplots.cern.ch [arXiv:1306.3436] 1.7M events ≥ Rivet 4.1.0,

(ATLAS_2023_I2628732)

) (atlas2023-wd) + (D* pT

0 50 100 150

1

Ratio to ATLAS

2

0.5

2

0.5

1