200 300 400 500 600 700 800 900 1000

ATLAS

13000 GeV pp WW

mcplots.cern.ch [arXiv:1306.3436]

(ATLAS_2019_I1734263)

(ATLAS WW)

j-veto Tp

30 40 50 60

1

Ratio to ATLAS

2

0.5

2

0.5

1