0.02

0.04

0.06

0.08

0.1

0.12

0.14

CMS

13000 GeV pp Z+Jet

mcplots.cern.ch [arXiv:1306.3436]

(CMS_2020_I1776758)

(CMS Z+c and Z+b)

ratio T Jet p

50 100 150 200

1

Ratio to CMS

2

0.5

2

0.5

1