2−10

1−10 1 10 210 310 410 510 610 710 810

CMS Pythia 8.315 default Pythia 8.315 default-noFsr Pythia 8.315 default-noRap

2760 GeV pp Jets

mcplots.cern.ch [arXiv:1306.3436] 2M events≥

Rivet 4.1.0,

(CMS_2021_I1963239)

(jj) (CMS Mueller-Navelet) yΔ

0 2 4 6 8

1

Ratio to CMS

2

0.5

2

0.5

1