0 100 200 300 400 500 600 700 800 900 CMS Pythia 6.428 390 Pythia 6.428 391 Pythia 6.428 392 Pythia 6.428 396 Pythia 6.428 397 Pythia 6.428 398

7000 GeV pp bb

mcplots.cern.ch [arXiv:1306.3436] 100k events≥

Rivet 4.1.0,

(CMS_2011_I884811)

> 6 GeV) μ (pT ^lη

2− 1− 0 1 2

1

Ratio to CMS

2

0.5

2

0.5

1