0

0.05

0.1

0.15

0.2

0.25 CMS

Herwig++ 2.7.1 default Herwig 7.2.1 default Herwig 7.2.1 softTune

7000 GeV pp Jets

mcplots.cern.ch [arXiv:1306.3436] 2M events≥

Rivet 4.1.0,

(CMS_2011_I889175)

(jets) (1800 < Mjj < 2200) χ

0 5 10 15

1

Ratio to CMS

2

0.5

2

0.5

1