η

0

50 100 150 200

250 300 350 400

[GeV] η dE/d int Total 1/N

LHCB Pythia 6.428 370 Pythia 6.428 371 Pythia 6.428 372 Pythia 6.428 376

7000 GeV pp Soft QCD

mcplots.cern.ch [arXiv:1306.3436] 100k events≥

Rivet 4.1.0,

(LHCB_2013_I1208105)

=7 TeV s Total EF -- non-diffractive enriched events,

2 3 4 η

1

Ratio to LHCB

2

0.5

2

0.5

1