|_{μμ}|y

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

[pb/GeV] μμ dy_{μμ} d m σ^2d #

ATLAS

Pythia 8.315 ropes

8000 GeV pp Z (Drell-Yan)

mcplots.cern.ch [arXiv:2401.10621] Rivet 4.1.0, 4.1M events

(ATLAS_2016_I1467454)

< 150 GeV μμ 116 GeV < m

0 0.5 1 1.5 2 |_{μμ}|y

1

Ratio to ATLAS

2

0.5

2

0.5

1