2

3

4

5

6

7

8

9 CDF Pythia 6.428 345 Pythia 6.428 370 Pythia 6.428 ambt1 Pythia 6.428 z2

1800 GeV ppbar Soft QCD

mcplots.cern.ch [arXiv:1306.3436] 2.1M events ≥ Rivet 4.1.0,

(CDF_1990_I283352)

| < 3.5) η(| Distribution η Charged Particle

0 1 2 3

1

Ratio to CDF

2

0.5

2

0.5

1